         180           8
   3.66160917117510        2.96558099174469        2.31706837767851     
   1.69336250282481        1.05849372142090       0.462260115055391     
 -4.790807779447358E-002 -0.560647367959946     
  -8.03856263117660       -8.12094760266930       -8.24746570525704     
  -8.43845866782988       -8.80132509816480       -9.10722387808885     
  -9.34577292495715       -9.60575037165285     
  2.142933212018203E-004  0.000000000000000E+000
  0.992517706514178       0.000000000000000E+000
  0.995285590241200       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
