         180           8
   12.3349450963386        11.7906443955481        11.1724687235047     
   10.6017585765175        10.0293185015267        9.42175530929704     
   8.81889087731723        8.20004452239515     
   18.7748208960749        18.8965239657318        18.9962042832314     
   19.1611044999837        19.3706218014166        19.5931038343298     
   19.7751555616934        19.9026223032022     
 -1.644216911837548E-003  0.000000000000000E+000
   1.00178062857581       0.000000000000000E+000
  0.999010935289604       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
