         180           8
   3.67855421624342        3.03740239008856        2.38396378249421     
   1.74711470987445        1.15735037546077       0.572929381997655     
  5.443410195532090E-002 -0.561335990351038     
  -8.16560038241923       -8.30539010437977       -8.44587985756314     
  -8.63092068048745       -8.81207441338318       -9.04258863822324     
  -9.32268467477922       -9.58826834718840     
  2.157163397095517E-004  0.000000000000000E+000
  0.992627039501737       0.000000000000000E+000
  0.995369627193656       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
