         180           8
   12.4371032776830        11.8278202289100        11.2395727261708     
   10.6379671171459        10.0350755219611        9.41154359522792     
   8.77857652693061        8.19748640079222     
   19.3246341214170        19.4858818595990        19.5862583723457     
   19.6642852825255        19.8251489783798        20.0441217771867     
   20.2569780528813        20.4548047160298     
 -1.643189270364070E-003  0.000000000000000E+000
   1.00175827352489       0.000000000000000E+000
  0.999045921759186       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
