         180           8
   12.2960733193773        11.6888063880986        11.1366200637527     
   10.5461040503619        9.95476597148539        9.34447159524449     
   8.71231746659163        8.16243431894143     
   19.2698142879141        19.2469529711288        19.4332078563852     
   19.6043406214967        19.7357167408717        19.8494297418815     
   19.9823565864633        20.1607562197744     
 -1.626577049487779E-003  0.000000000000000E+000
   1.00174122747162       0.000000000000000E+000
  0.998959829559179       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
