         180           8
   3.92368499503523        3.29203390342976        2.66539760849667     
   2.01062091070740        1.36784139545125       0.787650264842790     
  0.231145367807800      -0.245109846441390     
  -8.01878797372768       -8.04543947434683       -8.20150483740578     
  -8.41814130619186       -8.73179229197325       -9.04130702834783     
  -9.24620918684111       -9.44073682968063     
  1.503615482306041E-004  0.000000000000000E+000
  0.992850281808762       0.000000000000000E+000
  0.995618937772670       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
