         180           3
   12.2144679475686        10.1630329149322        8.06998331363523     
   19.1618627275101        19.5537874068753        20.0195722863244     
 -1.692268734281523E-003  0.000000000000000E+000
   1.00184352538394       0.000000000000000E+000
  0.998906233032054       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
