         180           8
  0.771281865763047       0.604342543875535       0.393252608950249     
  0.216604184537604       6.839143605116836E-002 -9.182111230116126E-002
 -0.221310727767543      -0.206979257220990     
  -11.6513600728383       -11.4178919174108       -11.1498124579086     
  -10.7948754687843       -10.3545324236667       -9.93396406000969     
  -9.52176052215468       -9.13521089868354     
  6.327187888163129E-004  0.000000000000000E+000
  0.991639397188791       0.000000000000000E+000
  0.994604283830638       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
