         180           3
   5.44733341574695        7.11954367862163        9.04733964460387     
   19.2771855655564        20.2609715481618        21.0523375437137     
 -1.713904746735842E-003  0.000000000000000E+000
   1.00140245481734       0.000000000000000E+000
  0.998681775306515       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
