         180           8
  0.775029347554774       0.656667974378975       0.524970678466031     
  0.386325239787139       0.253623633351048       0.150220530766330     
  5.569021484349152E-002 -8.040243467055407E-003
  -11.8223947171573       -11.5107077620084       -11.1529155832890     
  -10.7633753566658       -10.3067459642330       -9.85582944468936     
  -9.42358868533145       -9.18390326417321     
  6.026984892055718E-004  0.000000000000000E+000
  0.991695812666114       0.000000000000000E+000
  0.994599112809898       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
