         180           3
   5.39840783802784        7.04611052096390        8.94317723130848     
   19.6396229708098        20.4524857791266        21.1547163242479     
 -1.649114469884804E-003  0.000000000000000E+000
   1.00129277857571       0.000000000000000E+000
  0.998499721201767       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
