         180           8
  0.826541554333642       0.637426444833414       0.473211484917844     
  0.297654946259292       0.155739171004952       3.969847825102350E-002
 -0.105137842345309      -0.173399679590114     
  -11.5518188868906       -11.2827666908086       -10.9080233311582     
  -10.5313562818096       -10.1288096447862       -9.72445115175853     
  -9.33605624844083       -8.86453407504703     
  5.101825869188606E-004  0.000000000000000E+000
  0.991968172175467       0.000000000000000E+000
  0.994709255406057       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
