         180           8
  0.769104191787471       0.590493723378739       0.380640316519809     
  0.217154811863804       7.972871543550386E-002 -4.913766938433528E-002
 -0.193548621525141      -0.309880858175321     
  -11.3880902317334       -11.1326836273245       -10.8402542857983     
  -10.5096687966354       -10.1358022861949       -9.70811760399910     
  -9.22069399141848       -8.96997744524374     
  4.930194057333495E-004  0.000000000000000E+000
  0.991967662924955       0.000000000000000E+000
  0.994816782498085       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
