         180           3
   5.37870569911880        6.97935069617950        8.82055574691968     
   19.6877409272389        20.5147350694474        21.2680139465207     
 -1.662096931075529E-003  0.000000000000000E+000
   1.00129771650617       0.000000000000000E+000
  0.998545474423530       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
