         180           3
   5.32884728669612        6.94962636029466        8.85528514842999     
   19.9557215190436        20.4106024246435        21.2275485625123     
 -1.705443290075890E-003  0.000000000000000E+000
   1.00137251232835       0.000000000000000E+000
  0.998500700233678       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
