         180           8
  0.758857158133893       0.583488611474696       0.409382685846782     
  0.279008912375190       0.144558932854003       1.000024691324369E-002
 -7.430220788696752E-002 -0.240538636643393     
  -11.4222854373945       -11.1901142320179       -10.9056695089266     
  -10.5890790700689       -10.2023902477055       -9.75090730041239     
  -9.27887349599140       -8.93652428996820     
  4.918941630376974E-004  0.000000000000000E+000
  0.992133231553941       0.000000000000000E+000
  0.995035679868330       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
