         180           8
  0.995020616938094       0.818235267130676       0.593195828171144     
  0.428236159211756       0.282894587133256       7.324356186588196E-002
 -7.580262523138959E-002 -0.248688215957840     
  -11.2873958546140       -11.1026039572666       -10.7793610957852     
  -10.4016567684334       -10.0043909303803       -9.60277991024163     
  -9.21543797344337       -8.77319234629950     
  4.229575842905957E-004  0.000000000000000E+000
  0.992275376887672       0.000000000000000E+000
  0.995182851862329       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
