         180           3
   5.91692268291582        7.48349046677907        9.41553629538605     
   19.6682855320812        20.3561059955624        21.2658772538347     
 -1.673463989972761E-003  0.000000000000000E+000
   1.00117487567646       0.000000000000000E+000
  0.998076357586719       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
