         180           8
  0.279694502591922       0.152805712296090       4.618564079954751E-003
 -0.190598522214839      -0.355025688963021      -0.528015019540839     
 -0.662872015615237      -0.849680922731408     
  -11.8053836380018       -11.4061897794781       -11.0813417827240     
  -10.6783115135837       -10.2086098291657       -9.71576035145030     
  -9.19605375135731       -8.61189231013038     
  7.432335641917116E-004  0.000000000000000E+000
  0.991519938140156       0.000000000000000E+000
  0.994346090307053       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
