         180           8
  0.721696339601531       0.459548654374617       0.291058901283206     
  0.129691648409089       2.355439075594394E-003 -0.172182757603280     
 -0.307009331945342      -0.564213368796539     
  -12.3664500787609       -12.0635400792762       -11.6765408328366     
  -11.2993289583685       -10.8395632293698       -10.2815004179947     
  -9.75472690775804       -9.32128493337461     
  4.918164453556599E-004  0.000000000000000E+000
  0.991888509998728       0.000000000000000E+000
  0.994557293704557       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
