         180           3
   5.08530396164544        6.71903094996762        8.65045543056897     
   18.6887138928717        19.4929095656525        20.3568071614912     
 -1.743544736965595E-003  0.000000000000000E+000
   1.00154639613146       0.000000000000000E+000
  0.998111263588110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
