         180           8
  0.965474359243833       0.737441728558057       0.548174795997997     
  0.379682434664100       0.240440842246027       5.358649646631085E-002
 -0.115850414402279      -0.284300996215977     
  -12.7865750777131       -12.5140942947337       -12.1627073246125     
  -11.7821867048848       -11.3783279134112       -10.9167742511291     
  -10.4866965406260       -9.88932465955522     
  4.710533825069170E-004  0.000000000000000E+000
  0.991899374699687       0.000000000000000E+000
  0.994622220510480       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
