         180           8
   1.02972699540716       0.829894609265437       0.644054816790147     
  0.461289478658704       0.351433649163648       0.217459175137535     
  8.051077735178989E-002 -0.115907494909790     
  -12.6748062149134       -12.4625472409084       -12.1852817599547     
  -11.8403031842161       -11.5175718913386       -11.1360460140860     
  -10.6031316548002       -10.1812328059998     
  4.240086809322775E-004  0.000000000000000E+000
  0.991939185012922       0.000000000000000E+000
  0.994748204572197       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
