         180           3
   4.97930430026363        6.62703110040672        8.53533649750461     
   18.4505939916310        19.2131096978280        19.9290985428841     
 -1.715320563476237E-003  0.000000000000000E+000
   1.00139006117627       0.000000000000000E+000
  0.998181019180363       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
