         180           8
   1.43058986660046        1.16039705815824       0.959957982320788     
  0.733556813069872       0.584376778581875       0.442939679018179     
  0.335527452231788       0.101980153338010     
  -13.2933982085810       -13.1034137270218       -12.7679704401679     
  -12.4101053336186       -12.0270251454437       -11.6117750887398     
  -11.1339932361710       -10.6861087704499     
  2.795555182757678E-004  0.000000000000000E+000
  0.992345462109225       0.000000000000000E+000
  0.995160081183678       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
