         180           3
   4.62063020575266        6.26485709907512        8.25798970059010     
   18.2079215162761        18.9154210843643        19.7695752813919     
 -1.724910457082151E-003  0.000000000000000E+000
   1.00148633580780       0.000000000000000E+000
  0.998225945569967       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
