         180           8
   1.58134727191136        1.31838542959184        1.11721668117448     
  0.962160768634730       0.813517354376839       0.611355341645962     
  0.509153031583792       0.283274020069074     
  -13.5613517021082       -13.3486336103543       -13.0613964496176     
  -12.6946489186855       -12.2117831152672       -11.6899290745798     
  -11.2291415557854       -10.6806507214210     
  1.887892385245088E-004  0.000000000000000E+000
  0.992478986127968       0.000000000000000E+000
  0.995268382990928       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
