         180           8
   2.28178969613353        2.02496663488516        1.85038696994344     
   1.67705856425768        1.55469115625313        1.41029473147538     
   1.26841352847291        1.10466204599948     
  -14.2329625940998       -13.9746772915792       -13.6598641464040     
  -13.2877625729511       -12.8429465740783       -12.4430824673423     
  -12.0595927789335       -11.7378946531792     
  2.892262539414035E-006  0.000000000000000E+000
  0.992431529034696       0.000000000000000E+000
  0.995394519483177       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
