         180           8
   2.32816553823494        2.16599862381136        1.97619357204706     
   1.80012517545061        1.65642536593913        1.54533854088882     
   1.39710111825295        1.34594159085431     
  -14.0506220969191       -13.8348732978318       -13.5390475526686     
  -13.1683264817801       -12.7824754866278       -12.4207527667161     
  -12.0079241155786       -11.6495640529737     
 -1.454151139855911E-004  0.000000000000000E+000
  0.992917396810099       0.000000000000000E+000
  0.995928608099068       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
