         180           8
   4.81488046389851        4.21314731173714        3.57947943092244     
   2.91878519580298        2.31435643458330        1.79247546478847     
   1.21905619300028       0.744483118177685     
  -9.80734994217509       -9.84803093173467       -9.93511624852039     
  -10.0893601984219       -10.2641846499277       -10.4689036619895     
  -10.7037613243858       -10.8963370522678     
 -2.951208983318055E-004  0.000000000000000E+000
  0.993340948817342       0.000000000000000E+000
  0.996048005835772       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
