         180           3
   11.6968864565912        9.61819624152898        7.51245905077296     
   18.3077848048051        18.6700042253009        19.1459663789643     
 -1.647782159903893E-003  0.000000000000000E+000
   1.00195341129909       0.000000000000000E+000
  0.999058304651266       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
