         180           8
   4.86345192335913        4.21281111422090        3.58176773567053     
   2.99944017584255        2.38498532387389        1.81709820750696     
   1.27354150561462       0.779385313012545     
  -9.99905269986485       -10.0535720809618       -10.2142158568976     
  -10.4197465084658       -10.5872322168373       -10.8227214735461     
  -11.1032343577282       -11.3353627561675     
 -2.946203242309390E-004  0.000000000000000E+000
  0.993242180726689       0.000000000000000E+000
  0.996171163151153       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
