         180           3
   11.6581005566989        9.62731475273058        7.47964479610041     
   17.9648001258172        18.3756656781833        18.8939110467083     
 -1.636933417463940E-003  0.000000000000000E+000
   1.00199169412584       0.000000000000000E+000
  0.999226541117150       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
