         180           8
   4.77252668271652        4.14454684157486        3.54295015527677     
   2.95291013439768        2.32453408919561        1.75012245369275     
   1.21105878562264       0.771456543730422     
  -9.99671695412551       -10.0934868073943       -10.2261063161507     
  -10.3680680524468       -10.5660710684012       -10.8254304871388     
  -11.0801651117168       -11.3158824918105     
 -3.114888621136264E-004  0.000000000000000E+000
  0.993249596075076       0.000000000000000E+000
  0.996177322139113       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
