         180           8
   4.96453613034275        4.37395628414842        3.71445373117648     
   3.10792317540610        2.50026984099836        1.92152137191509     
   1.38903004810457       0.835607564283904     
  -9.61688628250556       -9.75905257723825       -9.97544089122936     
  -10.1997913838501       -10.4699079664126       -10.7792479301850     
  -11.0957060846640       -11.2536335120133     
 -2.860480137193486E-004  0.000000000000000E+000
  0.993422100828361       0.000000000000000E+000
  0.996262484092398       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
