         180           3
   4.14620293941102        5.82004438388031        7.71645822736261     
   18.0733376451041        18.9427864501959        19.6539423606400     
 -1.654490834702418E-003  0.000000000000000E+000
   1.00170662036204       0.000000000000000E+000
  0.998815629186077       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
