         180           3
   4.37968484219427        6.00718329522252        7.84347103935523     
   18.0919602864513        18.8773001680502        19.6494633706400     
 -1.713403480720167E-003  0.000000000000000E+000
   1.00167116342793       0.000000000000000E+000
  0.998920434407473       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
