         180           8
   1.88010530413239        1.79221830373190        1.56006904938751     
   1.40258364729487        1.24213221829551        1.08032868544620     
  0.989309239404447       0.828170738956307     
  -13.5446202064558       -13.2893726982418       -12.9946337711700     
  -12.6278720821962       -12.1649814458551       -11.7508381643883     
  -11.3538238699290       -11.0421597035310     
 -1.183099597293154E-004  0.000000000000000E+000
  0.992995565142270       0.000000000000000E+000
  0.995936050695461       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
