         180           3
   4.55233731726085        6.23701355339084        8.03826451526618     
   17.8022960697300        18.4629086998682        19.4741552409095     
 -1.707964369956723E-003  0.000000000000000E+000
   1.00168294208827       0.000000000000000E+000
  0.998970612487990       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
