         180           8
   1.98250322483982        1.78019311315673        1.65657796224692     
   1.52386655304926        1.38306938365725        1.26140616538860     
   1.11010774707277        1.03631482385650     
  -13.7068172970743       -13.5113457854025       -13.2364913902915     
  -12.8584142254543       -12.4571732100809       -12.0555701579171     
  -11.5619188249316       -11.0858138328921     
 -1.936529937408143E-004  0.000000000000000E+000
  0.993098235701100       0.000000000000000E+000
  0.996008999401703       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
