         180           3
   4.34889031262830        5.97446067572897        7.82017612178627     
   18.0441744515120        18.4099135518023        19.4212780720110     
 -1.664908899247012E-003  0.000000000000000E+000
   1.00162108272529       0.000000000000000E+000
  0.998946518380987       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
