         180           8
   2.13581779983267        1.95535302210424        1.81758449212582     
   1.70259836010971        1.56793306867753        1.42445429541926     
   1.29378580687493        1.19107073074514     
  -13.5130234699212       -13.3667173180098       -13.1408549671963     
  -12.8440213869182       -12.4586117202914       -12.0355466381474     
  -11.6168879623705       -11.1177702797306     
 -1.780150936039805E-004  0.000000000000000E+000
  0.993036615023527       0.000000000000000E+000
  0.996000438633520       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
