         180           3
   4.29566150189904        5.87797222587055        7.77289640419038     
   18.0543286190497        18.7162377875461        19.4458805260694     
 -1.662155250137166E-003  0.000000000000000E+000
   1.00168345911672       0.000000000000000E+000
  0.998968109157336       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
