         180           8
   2.26705034965877        2.09838275530022        1.92293540760148     
   1.75790715603023        1.57164177958332        1.44041438762831     
   1.34911606207920        1.21780373137869     
  -13.4361575903671       -13.2303852813794       -12.9446858721714     
  -12.6159891213407       -12.2462679168431       -11.8441746435465     
  -11.4626306458522       -11.0305244862127     
 -1.729869264344449E-004  0.000000000000000E+000
  0.993196395182761       0.000000000000000E+000
  0.996090200491949       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
