         180           8
   2.16135822641451        1.99201250517267        1.85620936407755     
   1.72119012212460        1.58614861516900        1.45889720715671     
   1.36277911488076        1.24708494109373     
  -13.1832284958516       -13.0780685822535       -12.8134782832739     
  -12.4396435076140       -12.0230573531497       -11.6297337936049     
  -11.2471726506384       -10.8439854256796     
 -1.199942438915800E-004  0.000000000000000E+000
  0.993237328042229       0.000000000000000E+000
  0.996144642361987       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
