         180           8
   2.17407983966751        2.01028303638377        1.85713190281815     
   1.69288117285610        1.52469782320476        1.39397060871407     
   1.27766629397399        1.15901339280326     
  -12.8620651953438       -12.7830349016875       -12.6717885456009     
  -12.2519433793737       -11.8643804580820       -11.4831036411477     
  -11.0789173514825       -10.5798132796125     
 -1.079376205636439E-004  0.000000000000000E+000
  0.993248640560809       0.000000000000000E+000
  0.996066642554507       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
