         180           3
   12.3917608303003        10.2685232904529        7.91852861810601     
   20.1804869526648        20.2959421624612        20.5977319874592     
 -1.604550389952494E-003  0.000000000000000E+000
   1.00188955220471       0.000000000000000E+000
  0.999310252305331       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
