         180           8
   3.57263011886781        2.98656387191789        2.40535534814489     
   1.80331651200119        1.23859863543675       0.683475913125103     
  0.119565267859432      -0.416024061421205     
  -6.91328516058621       -7.19808618263968       -7.48611194022503     
  -7.78542207713791       -8.15186541962627       -8.50765260893092     
  -8.89456101471177       -9.35857193639618     
  2.784788192643460E-004  0.000000000000000E+000
  0.992469403384849       0.000000000000000E+000
  0.995503407110868       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
