         180           8
   3.35295127773229        2.67014740255042        2.04250334670912     
   1.45636418728822       0.939618523402200       0.441840997770124     
 -3.800063538065420E-002 -0.612356004868268     
  -5.93200223248415       -6.03655297724566       -6.13194548590778     
  -6.40019223996854       -6.77597352348841       -7.16049587364599     
  -7.48718047705927       -7.63329107723508     
  3.237814452614306E-004  0.000000000000000E+000
  0.992600900784811       0.000000000000000E+000
  0.995461574236848       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
