         180           8
   3.19713420113805        2.50738632310637        1.90223557980180     
   1.27056177128961       0.649288118687099       0.124706425476819     
 -0.406280655954865      -0.899982414717588     
  -5.95667517567183       -5.99909348543889       -6.08208329907318     
  -6.23087829287777       -6.40804425372526       -6.66713388168287     
  -6.94530925511353       -7.20164214909783     
  3.098389951667269E-004  0.000000000000000E+000
  0.992658234262834       0.000000000000000E+000
  0.995364779970129       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
